/*
 * Copyright (C) 2026 Fluxer Contributors
 *
 * This file is part of Fluxer.
 *
 * Fluxer is free software: you can redistribute it and/or modify
 * it under the terms of the GNU Affero General Public License as published by
 * the Free Software Foundation, either version 3 of the License, or
 * (at your option) any later version.
 *
 * Fluxer is distributed in the hope that it will be useful,
 * but WITHOUT ANY WARRANTY; without even the implied warranty of
 * MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE. See the
 * GNU Affero General Public License for more details.
 *
 * You should have received a copy of the GNU Affero General Public License
 * along with Fluxer. If not, see <https://www.gnu.org/licenses/>.
 */

export const DEFAULT_KV_TIMEOUT_MS = 5000;
export const DEFAULT_EXPORT_TIMEOUT_MS = 30000;
export const DEFAULT_SENTRY_FLUSH_TIMEOUT_MS = 2000;
export const DEFAULT_QUEUE_VISIBILITY_TIMEOUT_MS = 30000;
export const DEFAULT_HTTP_WORKER_TIMEOUT_MS = 30000;
export const DEFAULT_SEARCH_CLIENT_TIMEOUT_MS = 30000;
export const DEFAULT_CSAM_SCAN_TIMEOUT_MS = 30000;
export const DEFAULT_FFPROBE_TIMEOUT_MS = 30000;
export const DEFAULT_THUMBNAIL_TIMEOUT_MS = 30000;
export const DEFAULT_FRAME_EXTRACTION_TIMEOUT_MS = 60000;
export const QUEUE_SNAPSHOT_INTERVAL_MS = 2000;
export const QUEUE_SNAPSHOT_AFTER_OPS = 50000;
